-100100

1992 1994 1996 1998 2000 2002 2004 2006

MARA_30313S001: Residuals to linear motion (mm)

North

-100100

East

-100100

Up

Number of DORIS satellites used for positioning

2 3 2 3 5 4

....................... 1-yr All_StDv, Noise      Stab
................... mm:   East  North    Up       indx

1992 1994 1996 1998 2000 2002 2004 2006

ignwd05 - 230 points   13.1 Wh  7.7 Wh  5.9 Wh ..  5.7
lcawd12 - 261 points    8.3 Wh  4.1 Wh  5.7 Wh ..  3.7
inawd03 - 244 points   11.5 Wh 11.7 Wh  6.2 Wh ..  5.9